signalDeltaZDistrHiMu

Entries 42 Mean -18.62 RMS 75.38 Underflow 0 Overflow 0

[mm] DCA z -2000-1500-1000 -500 0 500 1000 1500 2000

Entries/2 mm

0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5