signalDeltaZDistrHiMu_rebinned

Entries 42 Mean -11.13 RMS 55.68 Underflow 0 Overflow 0

[mm] DCA z -600 -400 -200 0 200 400 600

Entries/2 mm

0 2 4 6 8 10 12 14 16 18