signalDeltaZDistrLowMu_rebinned

Entries 28 Mean 16.85 RMS 70.05 Underflow 0 Overflow 0

[mm] DCA z -600 -400 -200 0 200 400 600

Entries/2 mm

0

2

4

6

8

10^{signalDeltaZDistrLowMu_rebinned}