Entries 16340 Mean 12.27 Mean y 1.631e-08 RMS 4.49 RMS y 0.4087

Energy [Gev]

0 10 20 30 40 50 60 70 80 90 100

Time [ns]

-0.4

-0.3

-0.2

-0.1

-0.0 0.1 0.2 0.3 Time Energy profile for High Gain for EMBASlot12