Entries 2342 Mean 54.16 Mean y -2.014e-08 RMS 28.77 RMS y 0.1405

Energy [Gev]

0 50 100 150 200 250 300

Time [ns]

-0.7

-0.6

-0.5

-0.4

-0.3

-0.2

-0.1

-0.0 0.1