Entries 1349 Mean 57.68 Mean y -2.154e-08 RMS 29.52 RMS y 0.1638

Energy [Gev]

0 50 100 150 200 250 300

Time [ns]

-0.5

-0.4

-0.3

-0.2

-0.1 0.0 0.1 0.2 0.3 0.4_{Entries 1349}

Time Energy profile for Medium Gain for EMBASlot12