Entries 1143 Mean 85.38 Mean y 1.202e-08 RMS 34.56 RMS y 0.1445

Energy [Gev]

0 50 100 150 200 250 300

Time [ns]

-0.4

-0.2

0.0

0.2

0.4

Time Energy profile for Medium Gain for EMBASlot13