Entries 1.535092e+07 Mean 0.0004233 RMS 0.3876 Constant 1.050e+02 ± 3.248e+05 Mean 0.000096 ± -0.000609 Sigma 0.0001 ± 0.3758

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1 10 210 310 410 510 ± ± ±