timeMediumAllBarrelASlots Entries 493065 Mean 0.1644 RMS 0.8106 Constant 8.4±

4896 Mean 0.0011 ± 0.1675 Sigma 0.0008 ± 0.7988

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310 ± ±