Entries 493065 Mean 0.0003679 RMS 0.733 Constant 9.6± 5449 Mean 0.0010368 ± -0.0001646 Sigma 0.0007 ± 0.7197

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310

410_{Entries 493065}

± ±