Entries 493065 Mean -0.0004789 RMS 0.3202 Constant 19.3±

9343 Mean 0.000519 ± -0.001512 Sigma 0.0004 ± 0.3116

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310

410_{Entries 493065}

± ±