Entries 86709 Mean -0.01839 RMS 0.3288 Constant 6.9±

1207 Mean 0.00146 ± -0.02017 Sigma 0.0011 ± 0.3196

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310^{Entries 86709} ± ±