Bins

1 2 3 4 5

Mean Time [ns]

-0.005

-0.004

-0.003

-0.002

-0.001

0.000

0.001

0.002

0.003

/ ndf

2χ 7.321e-07 / 3

p0 0.0005181 ± -0.006313

p1 0.0001562 ± 0.001773

±

±