HighGainC .23-.27 Efrac (Blue/Green)

Entries 38 Mean 23.46 RMS 11.14 p0 0.007 ± 1.438 p1 0.0003 ± 0.3291

Cell Energy [GeV]

0 10 20 30 40 50 60

Timing Resolution [ns]

0.32

0.34

0.36

0.38

0.40

0.42

0.44

0.46

0.48

0.50_{HighGainC .23-.27 Efrac (Blue/Green)}

± ±

HighGainA 0-.19 Efrac (Black/Red)

Entries 36 Mean 22.2 RMS 10.6 p0 0.004 ± 1.836 p1 0.0004 ± 0.3429 ± ±