HighGainE >.32 Efrac (Magenta/Light Blue)

Entries 39 Mean 25.16 RMS 11.42 p0 0.011± 1.501 p1 0.0003 ± 0.3012

Cell Energy [GeV]

0 10 20 30 40 50 60

Timing Resolution [ns]

0.30

0.35

0.40

0.45

0.50

± HighGainD .27-.32 Efrac (Blue/Green)

Entries 39 Mean 24.04 RMS 11.44 p0 0.009± 1.428 p1 0.0003 ± 0.3188 ±

HighGainB .19-.23 Efrac (Black/Red)

Entries 38 Mean 23.48 RMS 11.19 p0 0.006± 1.467 p1 0.0003 ± 0.3393 ±