Entries 31700 Mean 68.2 RMS 35.7

Cell Energy [GeV]

0 20 40 60 80 100 120 140 160 180 200

Timing Resolution [ns]

0.86

0.88

0.90

0.92

0.94

0.96

0.98

1.00

1.02

1.04^{Entries 31700}Mean 68.2_{RMS 35.7}