Entries 69647 Mean 62.08 RMS 29.26

Cell Energy [GeV]

0 20 40 60 80 100 120 140 160

Timing Resolution [ns]

0.82

0.84

0.86

0.88

0.90

0.92

0.94^{Entries 69647}Mean 62.08_{RMS 29.26}