Entries 64 Mean 0.4344 RMS 0.229

[Gev]

Cluster /E MaxCell E 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4

0.30

0.35

0.40

0.45

0.50

0.55

0.60

0.65

0.70