Entries 56 Mean 0.4308 RMS 0.1977

[Gev]

Cluster /E MaxCell E 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4

0.24

0.26

0.28

0.30

0.32

0.34

0.36

0.38

0.40

0.42

0.44