High Gain B (Blue/Green) Entries 39 Mean 23.74 RMS 11.52 p0 0.005± 1.911 p1 0.0003 ± 0.3161

Cell Energy [GeV]

0 10 20 30 40 50

Timing Resolution [ns]

0.30

0.32

0.34

0.36

0.38

0.40

0.42

0.44

0.46 High Gain B (Blue/Green) ±

High Gain A (Black/Red) Entries 39 Mean 23.76 RMS 11.54 p0 0.005± 1.903 p1 0.0003 ± 0.3145 ±