Medium Gain C Entries 16 Mean 68.58 RMS 39.91 / ndf

2χ 63.21 / 14 p0 0.5659 ± 0.9935 p1 0.0015 ± 0.2843

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.0

0.1

0.2

0.3

0.4

0.5_{Medium Gain C} ± ±