Medium Gain A (Black/Red)

Entries 17 Mean 73.88 RMS 44.16 p0 0.454 ± 1.133 p1 0.0014 ± 0.2832

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.0 0.1 0.2 0.3 0.4 0.5 ± ±