Medium Gain B Entries 15 Mean 61.38 RMS 29.04 p0 0.64± 0.92 p1 0.002± 0.286

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.00

0.05

0.10

0.15

0.20

0.25

0.30

0.35

0.40

0.45^{Medium Gain B}