Entries 17 Mean 90.31 RMS 54.03 p0 0.974546 ± 0.000796 p1 0.0016 ± 0.4329

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.30

0.35

0.40

0.45

0.50

0.55

0.60^{Entries 17} ± ±