Medium Zee D (Brown/Purple) Entries 16 Mean 69 RMS 36.86 p0 6.387e-01 ± 4.923e-13 p1 0.001± 0.363

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.20

0.25

0.30

0.35

0.40

0.45

0.50

0.55

±

Medium Zee C (Magenta/Light Blue)

Entries 17 Mean 83.23 RMS 49.41 p0 6.117e-01 ± 4.923e-13 p1 0.0014 ± 0.3989 ± ±

Medium Zee B (Blue/Green) Entries 17 Mean 80.6 RMS 47.55 p0 6.645e-01 ± 4.536e-12 p1 0.0014 ± 0.4083 ± ±

Medium Zee A (Black/Red)

Entries 17 Mean 85.24 RMS 49.81 p0 6.118e-01 ± -1.623e-07 p1 0.0014 ± 0.4065 ± ±