timeEnergy2DHighEMBASlot12_2

Entries 24 Mean 16.34 RMS 7.077 p0 0.015 ± 2.174 p1 0.0006 ± 0.2984

Cell Energy [GeV]

0 10 20 30 40 50 60

Timing Resolution [ns]

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9_{timeEnergy2DHighEMBASlot12_2} ± ±