timeEnergy2DHighEMECCSlot13_2 Entries 15 Mean 24.56 RMS 4.335 p0 0.9228711 ± 0.0002724 p1 0.0023± 0.3019

Cell Energy [GeV]

0 10 20 30 40 50 60

Timing Resolution [ns]

0.26

0.28

0.30

0.32

0.34^{timeEnergy2DHighEMECCSlot13_2} ±