timeEnergy2DMediumEMBASlot12_2

Entries 11 Mean 65.04 RMS 20.65 p0 0.355± 4.053 p1 0.0023 ± 0.2818

Cell Energy [GeV]

40 60 80 100 120 140

Timing Resolution [ns]

0.25

0.26

0.27

0.28

0.29

0.30

0.31

0.32

0.33_{timeEnergy2DMediumEMBASlot12_2}

±