timeEnergy2DMediumEMBASlot13_2

Entries 12 Mean 79.21 RMS 32.39 p0 0.261 ± 6.315 p1 0.0021 ± 0.2804

Cell Energy [GeV]

20 40 60 80 100 120 140 160 180 200

Timing Resolution [ns]

0.22

0.24

0.26

0.28

0.30

0.32

0.34

0.36

0.38

0.40^{timeEnergy2DMediumEMBASlot13_2} ± ±