energyGraphBarrel Entries 18 Mean 82.52 RMS 56.24 p0 0.194±

3.666 p1 0.0010 ± 0.2927

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.26

0.27

0.28

0.29

0.30

0.31

0.32

0.33_{energyGraphBarrel} ±