timeEnergy2DMediumEMECASlot13_2

Entries 17 Mean 85.48 RMS 55.76 p0 0.067 ± 4.431 p1 0.0005 ± 0.2813

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.20

0.25

0.30

0.35

0.40

0.45

± ±