energyGraphEmec Entries 18 Mean 84.89 RMS 55.38 p0 0.038± 6.107 p1 0.0004 ± 0.2962

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.26

0.28

0.30

0.32

0.34

0.36^{energyGraphEmec} ±