Entries 6 Mean 54.9 RMS 17.35

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.26

0.27

0.28

0.29

0.30

0.31

0.32

0.33

0.34

0.35_{Entries 6}