energyGraphBarrel

Entries 14 Mean 57.01 RMS 24.04 p0 8.367e-01 ± 2.245e-07 p1 0.0010 ± 0.3127

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.26

0.27

0.28

0.29

0.30

0.31

0.32

0.33

0.34_{energyGraphBarrel} ± ±