timeEnergy2DMediumEMECASlot13_2

Entries 13 Mean 59.26 RMS 22.58 p0 0.221± 4.527 p1 0.0017 ± 0.2762

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.22

0.24

0.26

0.28

0.30

0.32

0.34

0.36

0.38

0.40_{timeEnergy2DMediumEMECASlot13_2}

±