Entries 2.1021e+07 Mean 0.2453 RMS 0.08044

Efrac

0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4

Count

0 200 400 600 800 1000 310 ×^{Entries 2.1021e+07} Efrac of Electrons with eDepth<=1580