Entries 2.1021e+07 Mean -0.000766 RMS 1.194

Eta -2 -1 0 1 2 3

Count

0 1000

2000

3000

4000

5000

6000

7000^{Entries 2.1021e+07}

Eta of Electrons with eDepth<=1580