Entries 87739 Mean 0.3792 RMS 0.101

Efrac

0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4

Count

0 500 1000

1500

2000

2500

3000

3500

Efrac of Electrons with 1580<eDepth<1630