Entries 87739 Mean 0.02156 RMS 0.3299

Eta -1.5 -1.0 -0.5 0.0 0.5 1.0 1.5 2.0

Count

0 100 200 300 400 500 600 700 Eta of Electrons with 1580<eDepth<1630