Entries 6669 Mean 15.73 RMS 7.931

Emaxcell [GeV]

0 10 20 30 40 50 60

Count

0.000

0.002

0.004

0.006

0.008

0.010

0.012

0.014

0.016

Entries 87739 Mean 14.75 RMS 4.954

Entries 2.1021e+07 Mean 15.46 RMS 7.679