Entries 2428533 Mean 4.3e-06 RMS 0.4421 Constant 3.7e+01 ± 4.5e+04 Mean 0.000285 ± -0.006298 Sigma 0.0002 ± 0.4264

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310

410 ± ± ±