High Gain Zee (Blue/Green)

Entries 36 Mean 22.2 RMS 10.62 p0 0.015 ± 1.927 p1 0.001 ± 0.324

Cell Energy [GeV]

0 10 20 30 40 50 60

Timing Resolution [ns]

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 High Gain Zee (Blue/Green) ± ±

High Gain (Black/Red) Entries 39 Mean 23.84 RMS 11.54 p0 0.006± 1.905 p1 0.0003 ± 0.3275 ±