Entries 12366 Mean -0.02449 RMS 0.4531 Constant 168.6 Mean -0.02635 Sigma 0.4103

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210