Entries 12 Mean 52.76 RMS 18.9

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 Entries 14 Mean 56.91 RMS 23.94