timeEnergy2DHighEMBCSlot12_2

Entries 22 Mean 15.43 RMS 6.456 p0 0.041± 2.132 p1 0.0016 ± 0.3099

Cell Energy [GeV]

0 5 10 15 20 25

Timing Resolution [ns]

0.2

0.3 0.4

0.5

0.6^{timeEnergy2DHighEMBCSlot12_2} ±