timeEnergy2DMediumEMECASlot11_2

Entries 17 Mean 152.5 RMS 65.05

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0 2 4 6 8^{timeEnergy2DMediumEMECASlot11_2}