timeEnergy2DMediumEMECASlot12_2

Entries 15 Mean 81.24 RMS 43.37 p0 0.336±

2.923 p1 0.0016 ± 0.3727

Cell Energy [GeV]

0 20 40 60 80 100 120 140 160 180 200

Timing Resolution [ns]

0.25

0.30

0.35

0.40

0.45 ±