timeEnergy2DMediumEMECASlot13_2

Entries 14 Mean 65.59 RMS 31.91 p0 0.303± 3.779 p1 0.0019 ± 0.3481

Cell Energy [GeV]

0 20 40 60 80 100 120 140 160 180 200

Timing Resolution [ns]

0.30

0.35

0.40

0.45

0.50

±