energyGraphEmec Entries 18 Mean 83.6 RMS 53.87 p0 0.18± 12.93 p1 0.003± 0.386

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.30

0.35

0.40

0.45

0.50

0.55_{energyGraphEmec}