Entries 394551 Mean -0.0006902 RMS 0.4533 Constant 15.4±

7607 Mean 0.000666 ± -0.004015 Sigma 0.0005 ± 0.4101

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310

410_{Entries 394551} ± ±